%$Id: notes.tex,v 1.105 2023/02/27 07:55:35 brandenb Exp $
%\documentclass{article}
\documentclass[twocolumn]{article}
\setlength{\textwidth}{160mm}
\setlength{\oddsidemargin}{-0mm}
\setlength{\textheight}{220mm}
\setlength{\topmargin}{-8mm}
\usepackage{graphicx,natbib,bm,url,color}
\graphicspath{{./fig/}{./png/}}
\thispagestyle{empty}
\input macros
\def\red{\textcolor{red}}
\def\blue{\textcolor{blue}}
\title{}
\author{}
\date{\today,~ $ $Revision: 1.105 $ $}
\begin{document}
%\maketitle

\section{}


%\begin{enumerate}\itemsep-0.2mm
%\item
%\end{enumerate}

%\begin{equation}
%\end{equation}

% ~/data/axel/chiral_fluids/turbulent_decay/idl
\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{rspec_select_1024c_mu50}
Like Fig.~3, but for Run~IV.
Late times are not shown, because too much helicity is lost by then.
\end{center}\caption[]{
}\label{rspec_select_1024c_mu50}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{rspec_select_1024c_mu80_k02}
Like Fig.~3, but for Run~V.
Late times are not shown, because too much helicity is lost by then.
\end{center}\caption[]{
}\label{rspec_select_1024c_mu80_k02}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{rspec_select_1024c_mu160_k02}
Like Fig.~3, but for Run~VI.
Late times are not shown, because too much helicity is lost by then.
\end{center}\caption[]{
}\label{rspec_select_1024c_mu160_k02}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{pkmax_comp_IV}
Like Fig.~4, but for Run~IV.
\end{center}\caption[]{
}\label{pkmax_comp_IV}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{pkmax_comp_V}
Like Fig.~4, but for Run~V.
\end{center}\caption[]{
}\label{pkmax_comp_V}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{pkmax_comp_VI}
Like Fig.~4, but for Run~VI.
\end{center}\caption[]{
}\label{pkmax_comp_IV}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{phmax_comp_RunIV}
Like Fig.~8, but the blue line is here for Run~IV.
\end{center}\caption[]{
}\label{phmax_comp_RunIV}\end{figure}

\begin{figure}[h!]\begin{center}
\includegraphics[width=\columnwidth]{pkmax_comp_1024a_mu01_k002o}
Like Fig.~4, but for Run~P.
\end{center}\caption[]{
}\label{pkmax_comp_1024a_mu01_k002o}\end{figure}

%\begin{table}[htb]\caption{
%}\vspace{12pt}\centerline{\begin{tabular}{lccccccc}
%$R$ & $T$ & $\kf$ & $\omf$ & $\EEGW$ & $\hrms$ & $k_{\rm peak}$ \\
%\hline
%\label{Ttimescale}\end{tabular}}\end{table}

%r e f
%\begin{thebibliography}{}

%\bibitem[Biskamp \& M\"uller(1999)]{BM99}
%Biskamp, D., \& M\"uller, W.-C.\yprl{1999}{83}{2195}

%\end{thebibliography}

%\vfill\bigskip\noindent\tiny\begin{verbatim}
%$Header: /var/cvs/brandenb/tex/etc/notes.tex,v 1.105 2023/02/27 07:55:35 brandenb Exp $
%\end{verbatim}

\end{document}
